; Copyright 2023 The Chromium Authors
; Use of this source code is governed by a BSD-style license that can be
; found in the LICENSE file.
LIBRARY  "echo_preload_library.dll"

EXPORTS
  ; These are required for the echo service test.
  FnCallsDelayloadFn
